w

 OFF disconnects you from the BBS.

 Failing to log off properly (dropping carrier) will reduce your time limit by two minutes each time you do so. You can log off from almost anywhere in the system. When you do log off, you will be asked two questions:

 1. Leave Feedback - Hit "Y" if you wish to leave the sysop a feedback message, otherwise hit "N"

 2. Set messages to old - If you hit "Y" here, all messages that were new for you this time will not be on your read new scan next time. It is STRONGLY recommended that all new users set their messages to old on their first call to the BBS.

