w

 2AM-BBS runs on any IBM-PC or fully-compatible with at least 256K running MS-DOS version 2.1 or greater or PC-DOS version 2.1 or greater.  You also need a minimum 10-meg hard drive and a Hayes-compatible modem.  If you wish to find out more about 2AM-BBS, contact the sysop through feedback. If you have any additional questions after speaking with the sysop or if you would like to order a copy, write:

 2AM Associates
 59 Murphy Circle
 Florham Park, NJ 07932

 Or contact the authors directly at:

 The Drew University Underground BBS
 201-377-8245, 8193, 7861, 6810, 4538

